#-------------------------------------------------------------------------------
# This is a MicroStation V8 Annotation Scale Definition file.
#
# $Copyright: (c) 2004 Bentley Systems, Incorporated. All rights reserved. $
#
# Lines that begin with # are for descriptive comments.
#-------------------------------------------------------------------------------
# The active scales.def file is used to drive the Annotation Scale factor in the 
# Models dialog box.  The left column is the name that is displayed it the dialog
# box. The right column is the scale that is used. The two columns are separated 
# by a semicolon ";"
#
# The location of the scales.def file can be set with the configuration variable
# MS_CUSTOMSCALEDEF. The default location of this file is \Workspace\system\data\.
#
#
#   Name        Scale
#Full Size 1=1;	1:1
#1"=20';	240:1   
#1"=25';	300:1
#1"=30';	360:1   
#1"=40';	480:1   
#1"=50';	600:1   
#1"=100';	1200:1  
#1"=200';	2400:1  
#1"=500';	6000:1
#Direct scale names
Arch 1/32"=1'-0";	32:1
Arch 1/16"=1'-0";	16:1
Arch 1/8"=1'-0";	8:1
Arch 3/16"=1'-0";	16:3
Arch 1/4"=1'-0";	4:1
Arch 3/8"=1'-0";	8:3
Arch 1/2"=1'-0";	2:1
Arch 3/4"=1'-0";	4:3
Arch 1"=1'-0";		1:1
Arch 1 1/2"=1'-0";	2:3
Arch 3"=1'-0";		1:3
Arch 6"=1'-0";		1:6
Arch 12"=1'-0";		1:12
Engr 1:250,000;		250000:1
Engr 1:100,000;		100000:1
Engr 1:50,000;		50000:1
#Engr 1:25,000;		25000:1
Engr 1:10,000;		10000:1
Engr 1:5000;		5000:1
Engr 1:2000;		2000:1
Engr 1:1000;		1000:1
Engr 1:500;		500:1
Engr 1:400;		400:1 
Engr 1:250;		250:1
Engr 1:200;		200:1
Engr 1:100;		100:1
Engr 1:50;		50:1
Engr 1:40;		40:1
Engr 1:30;		30:1
Engr 1:25;		25:1
Engr 1:20;		20:1
Engr 1:10;		10:1
Engr 1:8;		8:1
Engr 1:6;		6:1
Engr 1:5;		5:1
Engr 1:4;		4:1
Engr 1:3;		3:1
Engr 1:2;		2:1
Engr 1:1;		1:1
