#-------------------------------------------------------------------------------
# This is a MicroStation V8 Annotation Scale Definition file.
#
# $Copyright: (c) 2004 Bentley Systems, Incorporated. All rights reserved. $
#
# Lines that begin with # are for descriptive comments.
#-------------------------------------------------------------------------------
# The active scales.def file is used to drive the Annotation Scale factor in the 
# Models dialog box.  The left column is the name that is displayed it the dialog
# box. The right column is the scale that is used. The two columns are separated 
# by a semicolon ";"
#
# The location of the scales.def file can be set with the configuration variable
# MS_CUSTOMSCALEDEF.
#
# UnitSystems:
# Used to filter the list of scales.  The user interface will typically use the active model's
# master units to control the visible scales.  Only scales that specify a system that matches 
# the system of the active model will be displayed.  Multiple systems can be specified.  If 
# 1,2,3 is specified then the scale will not be filtered based on the system.
# 
#   Valid values for System are:
#   1 English (based on International Foot)
#   2 Metric
#   3 English (based on US Survey Foot)
#
#
#   Name        	Scale		System
1:1;			1:1;		3
1:2;			2:1;		3
1:3;			3:1;		3
1:4;			4:1;		3
1:5;			5:1;		3
1:6;			6:1;		3
1:8;			8:1;		3
1:10;			10:1;		3
1:20;			20:1;		3
1:25;			25:1;		3
1:30;			30:1;		3
1:40;			40:1;		3
1:50;			50:1;		3
1:100;			100:1;		3
1:200;			200:1;		3
1:250;			250:1;		3
1:400;			400:1;		3
1:500;			500:1;		3
1:1000;			1000:1;		3
1:2000;			2000:1;		3
1:5000;			5000:1;		3
1:10,000;		10000:1;	3
#Engr 1:25,000;		25000:1;	3
1:50,000;		50000:1;	3
1:100,000;		100000:1;	3
1:250,000;		250000:1;	3
1/32"=1'-0";		32:1;		3
1/16"=1'-0";		16:1;		3
1/8"=1'-0";		8:1;		3
3/16"=1'-0";		16:3;		3
1/4"=1'-0";		4:1;		3
3/8"=1'-0";		8:3;		3
1/2"=1'-0";		2:1;		3
3/4"=1'-0";		4:3;		3
1"=1'-0";		1:1;		3
1 1/2"=1'-0";		2:3;		3
3"=1'-0";		1:3;		3
6"=1'-0";		1:6;		3
12"=1'-0";		1:12;		3
